%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Swierk2012} {\'S}wierk, W. (2012). \textit{Changes in the quality of surface water bodies against the background of the implementation of the sustainable development program of rural areas in the catchment}. PhD, PhD. Ph.D. thesis, Institute of Technology and Life Science at Falenty, .

\end{thebibliography}

\end{document}

